\setcounter{numTAs}{0}
\setcounter{totalSections}{1}
\def\secNum{{"001",""}}
\def\tenSchFileName{{"",""}}
\def\classTime{{"R from 03:00 pm to 05:30 pm in Tolentine Hall 426.",""}}
\def\classRm{{"Tolentine 226",""}}
\def\classLive{{"",""}}
\def\classInstructor{{"Stephen Konyk",""}}
\def\classInstrContact{{"",""}}
\def\classInstrOffHrs{{"Via Zoom and appointment",""}}
\def\classInstrLive{{"https://www.ece.villanova.edu/fmp/cgi/auth/appt",""}}
\def\TA{{{""},{""}}}
\def\TAEmail{{{""},{""}}}
\def\TAOffHrs{{{""},{""}}}
\def\TARoom{{{""},{""}}}
\newcommand\semester{Fall 2023}
\newcommand\rsemester{202420}
\newcommand\courseNum{ECE 2800}
\newcommand\courseName{Prof. Dev. Seminar}
\newcommand\courseCoordinator{Stephen Konyk}
\newcommand\credits{2}
\newcommand\contactHrs{3}
\newcommand\lecture{1}
\newcommand\lab{0}
\newcommand\undergradCourse{1}
\newcommand\isFreshmanCourse{0}
\newcommand\isCustomElecPolicy{0}
\newcommand\isClassLive{0}
\newcommand\isLabLive{0}
\newcommand\meetingMiscExists{0}
\newcommand\isClassInstrLive{1}
\newcommand\isLabInstrLive{0}
\newcommand\instrMiscExists{0}
\newcommand\hasTARoom{0}
\newcommand\meetingDesc{(one 2.5 hour lecture)}
\newcommand\meetingMisc{Special notes on meeting info go here, if specified}
\newcommand\instructorMisc{Special notes on instructor(s), TA(s) go here, if specified}
\newcommand\textBookExists{0}
\newcommand\textBookReqd{0}
\newcommand\textBookMiscExists{0}
\newcommand\referencesExist{0}
\newcommand\txtBkAuthExists{0}
\newcommand\txtBkPublExists{0}
\newcommand\txtBkYrExists{0}
\newcommand\txtBkISBNExists{0}
\newcommand\textBookTitle{N/A}
\newcommand\textBookAuth{}
\newcommand\textBookPub{}
\newcommand\textBookYr{}
\newcommand\textBookISBN{}
\newcommand\supplMaterials{As needed}
\newcommand\refPapers{References go here, if specified}
\newcommand\textBookMisc{Special notes on textbook(s) go here, if specified}
\newcommand\catalogDesc{Various professional development activities including: initiation into mentoring program, introduction to engineering ethics and professional responsibilities, field trips and other events on contemporary issues, peer evaluation process, development of oral and written communication skills, workshops on a variety of professional skills.}
\newcommand\preReqs{None}
\newcommand\coReqs{None}
\newcommand\coreRequirement{Required for BS CPE and BS EE}
\newcommand\courseExpectation{}
\newcommand\ABETOutOne{0}
\newcommand\ABETOutTwo{1}
\newcommand\ABETOutThree{1}
\newcommand\ABETOutFour{1}
\newcommand\ABETOutFive{1}
\newcommand\ABETOutSix{0}
\newcommand\ABETOutSeven{1}
\newcommand\covTopics{\item Resumes and Professional Profile
\item Career Fair
\item Small Business and Entrepreneurship
\item Large Company Success
\item Networking and Job Search 
\item Finding References for Engineering Reports
\item Engineering Ethics
\item Career Plan
\item Team Proposal Writing and Presentation}
\newcommand\isScheduleExternal{0}
\newcommand\isScheduleCommon{1}
\newcommand\scheduleRows{17}
\newcommand\scheduleCols{3}
\newcommand\scheduleHeight{1}
\newcommand\schedule{\begin{table}[h!] \centering 
\caption*{Tentative Schedule for \textbf{All Sections}} \vspace{0.05in}
{\renewcommand{\arraystretch}{1.5} \small
\begin{tabularx}{\linewidth}{c|c|X}
\toprule
\large \textbf{Week \#} & \large \textbf{Date} & \large \textbf{Topics
}\\
\midrule \midrule
1 & 8/24 & Introduction\\
2 & 8/31 & Ethics\\
3 & 9/7 & Career Fair\\
4 & 9/14 & Guest Speaker\\
5 & 9/21 & Guest Speaker\\
6 & 9/28 & Guest Speaker\\
7 & 10/5 & Guest Speaker\\
8 & 10/12 & Fall Break\\
9 & 10/19 & Guest Speaker\\
10 & 10/26 & IAB\\
11 & 11/2 & Presentation Prep\\
12 & 11/9 & Presentation\\
13 & 11/16 & Presentation\\
14 & 11/23 & Thanksgiving\\
15 & 11/30 & Written Proposal 1\\
16 & 12/7 & Written Proposal 2\\
\bottomrule \end{tabularx} } \end{table}}
\newcommand\gradingPolicy{Letter grade scale: A(93--100), A--(90--92), B+(87--89), B(83--86), B--(80--82), C+(77--79),\\
C(73--76), C--(70--72), D+(67--69), D(63--66), D--(60--62), F(<60)}
\newcommand\HWandLabPolicy{Late assignments require and excused absences require: \href{https://www1.villanova.edu/content/villanova/engineering/students_secure/forms/studentAbsence.html}{\textcolor{blue}{approval from the Dean}}.}
\newcommand\AttendancePolicy{}
\newcommand\ElectronicsPolicy{\textcolor{red}{Since you opted for a customize electronics policy, you should edit this part. Your policy should address your general stance on recording of class sessions and the circumstances under which recording will be allowed or prohibited. If you generally prohibit recording, yet allow recording of certain classes for some reason, then ypu should notify all students that those classes will be recorded. If recording is permitted as an ADA accommodation for a student, you obviously should not identify that student(s).)}}
